0 5 10 15 20 25 30 32 32.5 33 33.5 34 34.5 35 35.5 36 36.5 37

Frame number

PSNR

Kendo - QP 27 - Synthesized view (2% pkg losses)

Conventional H.264 without Errors Conventioanl H.264 + Feedback and Intra Refresh Modified H.264